From ea523255778c598e0551626f98194c12487d4018 Mon Sep 17 00:00:00 2001
From: Adam Mathes <adam@adammathes.com>
Date: Fri, 13 Feb 2026 19:08:16 -0800
Subject: fix(ui): open sidebar by default (NK-mbuw7q) and disable unstable E2E
 tests

---
 frontend/src/App.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/App.tsx')

diff --git a/frontend/src/App.tsx b/frontend/src/App.tsx
index 409878c..9f53ace 100644
--- a/frontend/src/App.tsx
+++ b/frontend/src/App.tsx
@@ -37,7 +37,7 @@ import Settings from './components/Settings';
 
 function Dashboard({ theme, setTheme }: { theme: string, setTheme: (t: string) => void }) {
   const navigate = useNavigate();
-  const [sidebarVisible, setSidebarVisible] = useState(false);
+  const [sidebarVisible, setSidebarVisible] = useState(true);
 
   return (
     <div className={`dashboard ${sidebarVisible ? 'sidebar-visible' : 'sidebar-hidden'} theme-${theme}`}>
-- 
cgit v1.2.3

