From 7ce4492aaf2035e6f041dd3fb1973f3d489d1c9f Mon Sep 17 00:00:00 2001
From: Adam Mathes <adam@trenchant.org>
Date: Mon, 19 Feb 2018 19:52:00 -0800
Subject: mysql utf-8 is not real utf-8

---
 init.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'init.sql')

diff --git a/init.sql b/init.sql
index 1e41f88..51938ee 100644
--- a/init.sql
+++ b/init.sql
@@ -1,5 +1,5 @@
-SET NAMES 'utf8';
-SET CHARACTER SET utf8;
+SET NAMES 'utf8mb4';
+SET CHARACTER SET utf8mb4;
 
 CREATE TABLE feed (
   id INT NOT NULL AUTO_INCREMENT,
-- 
cgit v1.2.3

